%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Benner_etal1997} Benner, S. G., Blowes, D. W., \& Ptacek, C. J. (1997). A full-scale porous reactive wall for prevention of acid mine drainage. \textit{Ground Water Monitoring and Remediation}, \textit{17}(4), 99--107.

\end{thebibliography}

\end{document}

